-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.231298392554
cusum  =  0.0842603979235
eta  =  0.636443069408
hl_amp_ratio  =  0.736718044981
kurtosis  =  -0.835744478946
n_points  =  480
period  =  0.686511288519
period_SNR  =  60.9506917248
period_log10FAP  =  -71.4785393529
period_uncertainty  =  0.000147594522055
phase_cusum  =  0.234613565071
phase_eta  =  0.182946195776
phi21  =  -2.13901623423
phi31  =  -1.15981910825
quartile31  =  0.31
r21  =  0.38983977461
r31  =  0.266970554924
shapiro_w  =  0.952987015247
skewness  =  -0.427752781756
slope_per10  =  -0.111387528868
slope_per90  =  0.106765769289
stetson_k  =  0.82993587082
weighted_mean  =  16.8477095614
weighted_std  =  0.188580659228
