-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.229123837422
cusum  =  0.161333721285
eta  =  0.651813139068
hl_amp_ratio  =  0.396212104476
kurtosis  =  -0.736622937666
n_points  =  161
period  =  0.584311603036
period_SNR  =  24.7093229882
period_log10FAP  =  -20.0453782325
period_uncertainty  =  0.000158411365864
phase_cusum  =  0.247034169641
phase_eta  =  0.179656653385
phi21  =  -1.85764828376
phi31  =  -3.41021898919
quartile31  =  0.27
r21  =  0.37570889783
r31  =  0.293497631494
shapiro_w  =  0.928927302361
skewness  =  -0.572582267575
slope_per10  =  -0.308599998243
slope_per90  =  0.472366637646
stetson_k  =  0.737502023172
weighted_mean  =  14.1822855232
weighted_std  =  0.177524576704
