-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.293235782272
cusum  =  0.124426175258
eta  =  0.537056427986
hl_amp_ratio  =  0.310029616884
kurtosis  =  -0.331718158931
n_points  =  342
period  =  0.587956693028
period_SNR  =  42.8788377795
period_log10FAP  =  -45.4742519297
period_uncertainty  =  0.000111594972961
phase_cusum  =  0.276129741014
phase_eta  =  0.155807813057
phi21  =  -2.35998723648
phi31  =  -4.41538579441
quartile31  =  0.35
r21  =  0.476314723644
r31  =  0.292030544496
shapiro_w  =  0.904790997505
skewness  =  -0.826521147096
slope_per10  =  -0.128798068167
slope_per90  =  0.171917787481
stetson_k  =  0.694961236753
weighted_mean  =  16.1135148452
weighted_std  =  0.253259207709
