-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.260994528354
cusum  =  0.11259133403
eta  =  0.570964137633
hl_amp_ratio  =  0.44020633461
kurtosis  =  -0.897787653153
n_points  =  458
period  =  0.583474559021
period_SNR  =  54.69726494
period_log10FAP  =  -64.6003203911
period_uncertainty  =  0.000106616136893
phase_cusum  =  0.24405509107
phase_eta  =  0.064864882245
phi21  =  0.887963121191
phi31  =  -0.980899374584
quartile31  =  0.37
r21  =  0.50409834348
r31  =  0.30904715161
shapiro_w  =  0.927867293358
skewness  =  -0.545744267366
slope_per10  =  -0.132495168664
slope_per90  =  0.138680125637
stetson_k  =  0.768851731356
weighted_mean  =  16.2354500911
weighted_std  =  0.226777935492
