-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.32


######### Lightcurve features #########

amplitude  =  0.0125119931153
cusum  =  0.209542145734
eta  =  1.30534598697
hl_amp_ratio  =  1.36848306589
kurtosis  =  0.764768191617
n_points  =  172
period  =  0.199581019966
period_SNR  =  13.5393811109
period_log10FAP  =  -3.54525905956
period_uncertainty  =  6.75416321302e-06
phase_cusum  =  0.192527267253
phase_eta  =  1.40448618851
phi21  =  2.80629668726
phi31  =  3.29540203327
quartile31  =  0.02
r21  =  0.122591910104
r31  =  0.0758910591287
shapiro_w  =  0.959912657738
skewness  =  -0.00914532432148
slope_per10  =  -0.18816350428
slope_per90  =  0.210540740363
stetson_k  =  0.73595438856
weighted_mean  =  14.9600581395
weighted_std  =  0.0168266501324
