-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.54


######### Lightcurve features #########

amplitude  =  0.300049390351
cusum  =  0.133256009043
eta  =  0.780621537159
hl_amp_ratio  =  0.748580636142
kurtosis  =  -1.13555894056
n_points  =  421
period  =  0.61714131931
period_SNR  =  48.8060780463
period_log10FAP  =  -55.3559063582
period_uncertainty  =  0.000106411017471
phase_cusum  =  0.32817483421
phase_eta  =  0.482753603462
phi21  =  0.910589605502
phi31  =  2.18467077954
quartile31  =  0.45
r21  =  0.26640848757
r31  =  0.195359385233
shapiro_w  =  0.929090619087
skewness  =  -0.364210705985
slope_per10  =  -0.0568533109873
slope_per90  =  0.0558737098424
stetson_k  =  0.851323801101
weighted_mean  =  16.8312546229
weighted_std  =  0.270958674272
