<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_c
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.212651611814
cusum  =  0.14704526745
eta  =  0.487717228868
hl_amp_ratio  =  1.08841857575
kurtosis  =  -1.27149289204
n_points  =  448
period  =  0.330681894978
period_SNR  =  65.850631265
period_log10FAP  =  -76.12835699
period_uncertainty  =  3.05485457179e-05
phase_cusum  =  0.253578427568
phase_eta  =  0.301184462683
phi21  =  -1.3994586455
phi31  =  -3.53302711499
quartile31  =  0.29
r21  =  0.0990092730391
r31  =  0.050001748974
shapiro_w  =  0.949850916862
skewness  =  -0.0193397723365
slope_per10  =  -0.0535360691779
slope_per90  =  0.0341927469974
stetson_k  =  0.889093187836
weighted_mean  =  16.4052882747
weighted_std  =  0.160451667777
</pre></body></html>