-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.188850589937
cusum  =  0.105979517593
eta  =  0.886178275519
hl_amp_ratio  =  0.563152208828
kurtosis  =  -0.847406187241
n_points  =  443
period  =  0.649106539968
period_SNR  =  51.8948319052
period_log10FAP  =  -51.9254935678
period_uncertainty  =  0.000117719724422
phase_cusum  =  0.245598448478
phase_eta  =  0.654656260701
phi21  =  -2.71375679323
phi31  =  -1.53889945457
quartile31  =  0.3
r21  =  0.319926297608
r31  =  0.182059098209
shapiro_w  =  0.951341092587
skewness  =  -0.440579962735
slope_per10  =  -0.0904838756488
slope_per90  =  0.0927022083595
stetson_k  =  0.814074961264
weighted_mean  =  17.6561259462
weighted_std  =  0.176028906735
