-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.111498649464
cusum  =  0.205940509156
eta  =  0.658844938907
hl_amp_ratio  =  0.790083231893
kurtosis  =  -0.646036657207
n_points  =  441
period  =  0.652525767111
period_SNR  =  48.9698084638
period_log10FAP  =  -49.8246932658
period_uncertainty  =  0.000118288337991
phase_cusum  =  0.271279605175
phase_eta  =  0.689018787953
phi21  =  1.3282116831
phi31  =  2.75988269682
quartile31  =  0.16
r21  =  0.297667037478
r31  =  0.170544435154
shapiro_w  =  0.985110044479
skewness  =  -0.121780414694
slope_per10  =  -0.172694236936
slope_per90  =  0.0730205924839
stetson_k  =  0.838441362001
weighted_mean  =  16.2248835963
weighted_std  =  0.103783024701
