-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.21601077129
cusum  =  0.105990601221
eta  =  0.562763965404
hl_amp_ratio  =  0.596208183144
kurtosis  =  -0.896769318928
n_points  =  278
period  =  0.626062169376
period_SNR  =  34.6670984123
period_log10FAP  =  -35.7098844979
period_uncertainty  =  0.000104692673275
phase_cusum  =  0.219998446719
phase_eta  =  0.202488241214
phi21  =  -1.91542555455
phi31  =  -0.790387532611
quartile31  =  0.2875
r21  =  0.46384808478
r31  =  0.234489344704
shapiro_w  =  0.944452047348
skewness  =  -0.455856113761
slope_per10  =  -0.213847099136
slope_per90  =  0.296428457746
stetson_k  =  0.813199476053
weighted_mean  =  15.102497919
weighted_std  =  0.183866361722
