-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.217063074182
cusum  =  0.17919893213
eta  =  0.541555941142
hl_amp_ratio  =  0.790621987075
kurtosis  =  -1.02949552938
n_points  =  391
period  =  0.748359414069
period_SNR  =  49.3110508919
period_log10FAP  =  -55.4638349803
period_uncertainty  =  0.000155921211196
phase_cusum  =  0.30735083386
phase_eta  =  0.174454277557
phi21  =  1.30625974418
phi31  =  2.72331659649
quartile31  =  0.29
r21  =  0.477754676781
r31  =  0.259908332669
shapiro_w  =  0.957285284996
skewness  =  -0.247347497682
slope_per10  =  -0.132407525671
slope_per90  =  0.378751437373
stetson_k  =  0.845833518226
weighted_mean  =  13.4517952014
weighted_std  =  0.193694936456
