-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.39


######### Lightcurve features #########

amplitude  =  0.389879481762
cusum  =  0.285434387376
eta  =  0.166901824273
hl_amp_ratio  =  2.71194396855
kurtosis  =  4.94271086246
n_points  =  292
period  =  0.743909891827
period_SNR  =  11.5608553668
period_log10FAP  =  -6.28697100983
period_uncertainty  =  0.00014903235846
phase_cusum  =  0.229560331805
phase_eta  =  1.92017798674
phi21  =  0.125635661005
phi31  =  2.57578905621
quartile31  =  0.3525
r21  =  0.501573094574
r31  =  0.16999360529
shapiro_w  =  0.632093250751
skewness  =  2.38980832395
slope_per10  =  -0.0551506398443
slope_per90  =  0.11979999952
stetson_k  =  0.566855691943
weighted_mean  =  16.1526684702
weighted_std  =  0.634016689035
