-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.327689012122
cusum  =  0.144615496627
eta  =  0.596561597565
hl_amp_ratio  =  0.819690724889
kurtosis  =  -0.977522550865
n_points  =  208
period  =  0.688619203887
period_SNR  =  29.9873882033
period_log10FAP  =  -25.7469573753
period_uncertainty  =  0.000168682757869
phase_cusum  =  0.282444151575
phase_eta  =  0.0486999096937
phi21  =  -2.14753631759
phi31  =  -4.07992649713
quartile31  =  0.45
r21  =  0.504171925792
r31  =  0.324075421601
shapiro_w  =  0.954956233501
skewness  =  -0.295240671671
slope_per10  =  -0.30062006393
slope_per90  =  0.428950002727
stetson_k  =  0.850336141736
weighted_mean  =  13.9630627725
weighted_std  =  0.262209666865
