-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.277316486149
cusum  =  0.156089124517
eta  =  0.906213574183
hl_amp_ratio  =  0.920838008669
kurtosis  =  -0.439109602783
n_points  =  377
period  =  0.64410963
period_SNR  =  37.4932537433
period_log10FAP  =  -33.3204374179
period_uncertainty  =  0.000115027796578
phase_cusum  =  0.211154713439
phase_eta  =  0.77530810848
phi21  =  -2.07765782337
phi31  =  -0.909755886873
quartile31  =  0.44
r21  =  0.567630815712
r31  =  0.251599243886
shapiro_w  =  0.989286005497
skewness  =  -0.175742705769
slope_per10  =  -0.0664120441957
slope_per90  =  0.0613283347387
stetson_k  =  0.81287170408
weighted_mean  =  18.4592635958
weighted_std  =  0.29303720399
