-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.189917148556
cusum  =  0.153817259164
eta  =  0.581528122715
hl_amp_ratio  =  0.739670476018
kurtosis  =  -0.849785494932
n_points  =  354
period  =  0.582452836843
period_SNR  =  46.4536451852
period_log10FAP  =  -49.6392994256
period_uncertainty  =  0.000112863879094
phase_cusum  =  0.310238282056
phase_eta  =  0.156722973837
phi21  =  -2.04316291673
phi31  =  -0.575286860293
quartile31  =  0.23
r21  =  0.446957920311
r31  =  0.191688403271
shapiro_w  =  0.974023044109
skewness  =  -0.250249745463
slope_per10  =  -0.157118603042
slope_per90  =  0.21706666487
stetson_k  =  0.826926536912
weighted_mean  =  16.1704259306
weighted_std  =  0.147987811497
