-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.77


######### Lightcurve features #########

amplitude  =  0.324506953179
cusum  =  0.241928693606
eta  =  1.0023638722
hl_amp_ratio  =  0.600491412463
kurtosis  =  -0.695029805278
n_points  =  116
period  =  0.630298047968
period_SNR  =  22.3018208488
period_log10FAP  =  -12.3329278796
period_uncertainty  =  0.000116635467929
phase_cusum  =  0.319935115488
phase_eta  =  0.172386965342
phi21  =  -2.453984728
phi31  =  -4.28185795509
quartile31  =  0.3975
r21  =  0.490306563136
r31  =  0.328036553772
shapiro_w  =  0.9319024086
skewness  =  -0.560150336445
slope_per10  =  -0.411341968145
slope_per90  =  0.589856416318
stetson_k  =  0.834718731586
weighted_mean  =  14.3158359317
weighted_std  =  0.264954732559
