-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.318604132396
cusum  =  0.114185958215
eta  =  0.488923272611
hl_amp_ratio  =  0.334574070996
kurtosis  =  -0.55173178181
n_points  =  456
period  =  0.612290172308
period_SNR  =  55.0444956319
period_log10FAP  =  -62.8108716092
period_uncertainty  =  0.000104672146725
phase_cusum  =  0.253943730749
phase_eta  =  0.124138125702
phi21  =  -2.21829557659
phi31  =  -1.1500692098
quartile31  =  0.39
r21  =  0.435156546783
r31  =  0.310072545421
shapiro_w  =  0.887058615685
skewness  =  -0.821624756492
slope_per10  =  -0.113968220063
slope_per90  =  0.102835779018
stetson_k  =  0.741762669227
weighted_mean  =  15.4029420167
weighted_std  =  0.268471132525
