-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.352531448801
cusum  =  0.201427670067
eta  =  0.536004704795
hl_amp_ratio  =  0.312725292139
kurtosis  =  -0.710553980646
n_points  =  189
period  =  0.574666655193
period_SNR  =  29.7039611656
period_log10FAP  =  -24.1124562729
period_uncertainty  =  0.000155116187179
phase_cusum  =  0.250106781429
phase_eta  =  0.347112214648
phi21  =  0.80506152787
phi31  =  -1.03605105945
quartile31  =  0.47
r21  =  0.402162680267
r31  =  0.228830934486
shapiro_w  =  0.886851072311
skewness  =  -0.739440056948
slope_per10  =  -0.214815206713
slope_per90  =  0.236733290296
stetson_k  =  0.744388497345
weighted_mean  =  14.3013213295
weighted_std  =  0.291740608322
