-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.333293926288
cusum  =  0.137254212179
eta  =  0.671597991655
hl_amp_ratio  =  0.362122762635
kurtosis  =  -0.454293393038
n_points  =  307
period  =  0.603693702696
period_SNR  =  37.4087522538
period_log10FAP  =  -39.5970052787
period_uncertainty  =  0.000100208106809
phase_cusum  =  0.282931555388
phase_eta  =  0.136290108175
phi21  =  0.912372857931
phi31  =  -1.1320166489
quartile31  =  0.415
r21  =  0.472101425831
r31  =  0.271730428446
shapiro_w  =  0.906328439713
skewness  =  -0.790770253959
slope_per10  =  -0.19022689866
slope_per90  =  0.266800008249
stetson_k  =  0.728911790708
weighted_mean  =  14.2115142518
weighted_std  =  0.279367540135
