-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.356868356441
cusum  =  0.182104981449
eta  =  0.533327239175
hl_amp_ratio  =  0.159009810421
kurtosis  =  -0.614274050387
n_points  =  167
period  =  0.579155962454
period_SNR  =  24.7593806427
period_log10FAP  =  -20.2458946914
period_uncertainty  =  0.000118179020521
phase_cusum  =  0.328637097138
phase_eta  =  0.117313962479
phi21  =  0.674901818721
phi31  =  -1.45978283487
quartile31  =  0.48
r21  =  0.485255905538
r31  =  0.25757316757
shapiro_w  =  0.838913917542
skewness  =  -0.89140346305
slope_per10  =  -0.243116643408
slope_per90  =  0.492800008506
stetson_k  =  0.658674741525
weighted_mean  =  13.8495420419
weighted_std  =  0.335054958079
