-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.32827206375
cusum  =  0.12294722922
eta  =  0.595905104675
hl_amp_ratio  =  0.325883722135
kurtosis  =  -0.214031083602
n_points  =  350
period  =  0.604797774648
period_SNR  =  37.8587674819
period_log10FAP  =  -39.9960251177
period_uncertainty  =  0.00010140127942
phase_cusum  =  0.285416906892
phase_eta  =  0.331441780341
phi21  =  0.920735469095
phi31  =  2.2818988568
quartile31  =  0.365
r21  =  0.437410900401
r31  =  0.321761622764
shapiro_w  =  0.88382935524
skewness  =  -0.936387430009
slope_per10  =  -0.0696290684603
slope_per90  =  0.226214087608
stetson_k  =  0.717599134636
weighted_mean  =  13.7024329869
weighted_std  =  0.287735779344
