-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.82


######### Lightcurve features #########

amplitude  =  0.135612731636
cusum  =  0.0938015999711
eta  =  0.739507502358
hl_amp_ratio  =  1.13933526798
kurtosis  =  -1.06487177751
n_points  =  158
period  =  0.764539625198
period_SNR  =  21.3996787044
period_log10FAP  =  -14.8801101402
period_uncertainty  =  0.000302548363655
phase_cusum  =  0.259280768595
phase_eta  =  0.618116134654
phi21  =  -1.76229307107
phi31  =  -3.8296646987
quartile31  =  0.2
r21  =  0.306540603541
r31  =  0.139215086785
shapiro_w  =  0.962337493896
skewness  =  0.0920437350809
slope_per10  =  -0.391351306558
slope_per90  =  0.614020479436
stetson_k  =  0.836418444987
weighted_mean  =  14.9075680599
weighted_std  =  0.118494809212
