-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.86


######### Lightcurve features #########

amplitude  =  0.219245716967
cusum  =  0.115511832601
eta  =  0.761868570013
hl_amp_ratio  =  0.561555378518
kurtosis  =  -1.17602077226
n_points  =  157
period  =  0.742367730939
period_SNR  =  24.7296362712
period_log10FAP  =  -19.1457437033
period_uncertainty  =  0.000178231002596
phase_cusum  =  0.260792112191
phase_eta  =  0.165462004098
phi21  =  1.31365203009
phi31  =  2.53439038117
quartile31  =  0.33
r21  =  0.441738407117
r31  =  0.29267855041
shapiro_w  =  0.937516450882
skewness  =  -0.265445599318
slope_per10  =  -0.382237316806
slope_per90  =  0.646033954594
stetson_k  =  0.814315819921
weighted_mean  =  14.6700538701
weighted_std  =  0.196553008482
