-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.330051561567
cusum  =  0.109154856861
eta  =  0.602872897747
hl_amp_ratio  =  0.534644570795
kurtosis  =  -0.807895528959
n_points  =  370
period  =  0.642961484492
period_SNR  =  39.2885482401
period_log10FAP  =  -43.3792189541
period_uncertainty  =  0.000114601722534
phase_cusum  =  0.208384170711
phase_eta  =  0.272252347349
phi21  =  -2.21086318909
phi31  =  -4.05485830196
quartile31  =  0.42
r21  =  0.538267106684
r31  =  0.326409009029
shapiro_w  =  0.931354820728
skewness  =  -0.541449628696
slope_per10  =  -0.117523423433
slope_per90  =  0.220833539712
stetson_k  =  0.793042928566
weighted_mean  =  14.9013233634
weighted_std  =  0.299875540376
