-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.44


######### Lightcurve features #########

amplitude  =  0.391273469544
cusum  =  0.276369961167
eta  =  1.84838701873
hl_amp_ratio  =  1.10003151795
kurtosis  =  0.367083926529
n_points  =  331
period  =  0.641758408281
period_SNR  =  23.4104584216
period_log10FAP  =  -11.983451179
period_uncertainty  =  0.000109972997871
phase_cusum  =  0.198319846548
phase_eta  =  1.79817682437
phi21  =  -2.56638318786
phi31  =  -0.762570959927
quartile31  =  0.6
r21  =  0.480480818298
r31  =  0.469457852567
shapiro_w  =  0.9090102911
skewness  =  0.874307967955
slope_per10  =  -0.0777571634032
slope_per90  =  0.0783560033219
stetson_k  =  0.7880903982
weighted_mean  =  16.9433833018
weighted_std  =  0.514665339859
