-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.39


######### Lightcurve features #########

amplitude  =  0.272233454418
cusum  =  0.178651589903
eta  =  1.67144237261
hl_amp_ratio  =  1.19599984274
kurtosis  =  -0.121237428218
n_points  =  313
period  =  0.702628679289
period_SNR  =  21.7541422214
period_log10FAP  =  -10.8363544515
period_uncertainty  =  0.000109494888009
phase_cusum  =  0.273052800901
phase_eta  =  1.38053519004
phi21  =  -2.13380883573
phi31  =  -3.52013208093
quartile31  =  0.54
r21  =  0.692235301836
r31  =  0.374187696447
shapiro_w  =  0.979988336563
skewness  =  0.488894793584
slope_per10  =  -0.0385640181809
slope_per90  =  0.0420378804222
stetson_k  =  0.813185553442
weighted_mean  =  19.1045625961
weighted_std  =  0.349318245097
