-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.74


######### Lightcurve features #########

amplitude  =  0.118628929782
cusum  =  0.080652735385
eta  =  1.21787710423
hl_amp_ratio  =  0.840872978803
kurtosis  =  1.80578949091
n_points  =  394
period  =  0.644922129636
period_SNR  =  43.8119923548
period_log10FAP  =  -34.2714328812
period_uncertainty  =  0.000116126863604
phase_cusum  =  0.203787298754
phase_eta  =  0.975785800867
phi21  =  4.27127773469
phi31  =  5.81475573711
quartile31  =  0.1575
r21  =  0.284370466075
r31  =  0.160854064294
shapiro_w  =  0.967991948128
skewness  =  -0.422031441261
slope_per10  =  -0.13471634425
slope_per90  =  0.155448156848
stetson_k  =  0.791523653758
weighted_mean  =  16.5815098648
weighted_std  =  0.108923761585
