-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.242302656423
cusum  =  0.237706038698
eta  =  0.717577815893
hl_amp_ratio  =  0.300202367179
kurtosis  =  1.82829908092
n_points  =  94
period  =  0.602967366437
period_SNR  =  10.3739177666
period_log10FAP  =  -6.72998416906
period_uncertainty  =  0.000107228514857
phase_cusum  =  0.212272918262
phase_eta  =  0.367229738325
phi21  =  3.11218921681
phi31  =  2.8259983942
quartile31  =  0.1575
r21  =  0.411130788331
r31  =  0.405550561441
shapiro_w  =  0.801281571388
skewness  =  -1.56444774873
slope_per10  =  -0.403200015426
slope_per90  =  0.500352048377
stetson_k  =  0.644800942544
weighted_mean  =  13.2318085106
weighted_std  =  0.187338371562
