-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.283177957187
cusum  =  0.167605942769
eta  =  0.629396957309
hl_amp_ratio  =  0.563279404604
kurtosis  =  -0.387744949668
n_points  =  380
period  =  0.608381512616
period_SNR  =  43.1060948526
period_log10FAP  =  -46.083545117
period_uncertainty  =  0.000102621538566
phase_cusum  =  0.215280629045
phase_eta  =  0.391556132506
phi21  =  -2.21375533197
phi31  =  -4.19674352575
quartile31  =  0.36
r21  =  0.433368873349
r31  =  0.196505270504
shapiro_w  =  0.954630851746
skewness  =  -0.618595166548
slope_per10  =  -0.0594653987382
slope_per90  =  0.0773268872334
stetson_k  =  0.761895093634
weighted_mean  =  16.2320612759
weighted_std  =  0.252774555519
