-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.249130523088
cusum  =  0.128265371376
eta  =  0.630976122193
hl_amp_ratio  =  0.756327178675
kurtosis  =  -0.593939841397
n_points  =  406
period  =  0.646271563943
period_SNR  =  43.7175273737
period_log10FAP  =  -46.6115943886
period_uncertainty  =  0.000116613421895
phase_cusum  =  0.205103631781
phase_eta  =  0.312705466469
phi21  =  -2.08909416145
phi31  =  -3.82838647278
quartile31  =  0.33
r21  =  0.53587789427
r31  =  0.287845040527
shapiro_w  =  0.978882730007
skewness  =  -0.322891263676
slope_per10  =  -0.0765140129486
slope_per90  =  0.111437417362
stetson_k  =  0.789563380791
weighted_mean  =  16.9802599327
weighted_std  =  0.238493491708
