-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.5


######### Lightcurve features #########

amplitude  =  0.185620024329
cusum  =  0.142158235345
eta  =  0.606578293427
hl_amp_ratio  =  0.348721945971
kurtosis  =  0.41808900567
n_points  =  224
period  =  0.852698328326
period_SNR  =  24.4417696711
period_log10FAP  =  -22.823823
period_uncertainty  =  0.000194112723261
phase_cusum  =  0.255714010019
phase_eta  =  0.264297515075
phi21  =  0.947810423211
phi31  =  4.58921294901
quartile31  =  0.22
r21  =  0.444783601299
r31  =  0.433056086873
shapiro_w  =  0.884573698044
skewness  =  -1.0919352614
slope_per10  =  -0.29349999968
slope_per90  =  0.557974220705
stetson_k  =  0.709364123053
weighted_mean  =  13.1249107143
weighted_std  =  0.158212648129
