<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  EB_ESD
class_probability =  0.51


######### Lightcurve features #########

amplitude  =  0.32315209366
cusum  =  0.242510781573
eta  =  1.2423508166
hl_amp_ratio  =  1.3245577982
kurtosis  =  0.464149219804
n_points  =  326
period  =  0.563061553544
period_SNR  =  25.1583637154
period_log10FAP  =  -17.9520108768
period_uncertainty  =  8.79014560254e-05
phase_cusum  =  0.276169514953
phase_eta  =  1.15317332901
phi21  =  -2.63332565024
phi31  =  -1.73813899397
quartile31  =  0.4775
r21  =  0.127785981739
r31  =  0.235430891502
shapiro_w  =  0.947367012501
skewness  =  0.838165721833
slope_per10  =  -0.033806999431
slope_per90  =  0.0401875004172
stetson_k  =  0.801436755118
weighted_mean  =  18.4059140159
weighted_std  =  0.367744374183
</pre></body></html>