<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.312000157443
cusum  =  0.132065712593
eta  =  0.685569969369
hl_amp_ratio  =  0.204047855083
kurtosis  =  1.28312966257
n_points  =  143
period  =  0.429816061529
period_SNR  =  20.4152966149
period_log10FAP  =  -13.2966645832
period_uncertainty  =  7.63671385285e-05
phase_cusum  =  0.213729443067
phase_eta  =  0.191095644785
phi21  =  -2.48012974366
phi31  =  -1.56756399611
quartile31  =  0.27
r21  =  0.511335149863
r31  =  0.34877847869
shapiro_w  =  0.799566626549
skewness  =  -1.47534175776
slope_per10  =  -0.228619164611
slope_per90  =  0.26625174049
stetson_k  =  0.610862032106
weighted_mean  =  14.9649824862
weighted_std  =  0.25625485194
</pre></body></html>