-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.223704404208
cusum  =  0.195874835355
eta  =  0.55271837157
hl_amp_ratio  =  0.316078162172
kurtosis  =  -0.588286174084
n_points  =  170
period  =  0.626082157193
period_SNR  =  20.4190550361
period_log10FAP  =  -17.977660269
period_uncertainty  =  0.000105422336875
phase_cusum  =  0.258677993753
phase_eta  =  0.268660264765
phi21  =  4.25747038123
phi31  =  5.53412419793
quartile31  =  0.3175
r21  =  0.410788778506
r31  =  0.297569091626
shapiro_w  =  0.910082221031
skewness  =  -0.725614230706
slope_per10  =  -0.279279134744
slope_per90  =  0.316849989623
stetson_k  =  0.70844785091
weighted_mean  =  16.0171297569
weighted_std  =  0.192071237351
