-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.343300108872
cusum  =  0.226468978724
eta  =  0.579815443452
hl_amp_ratio  =  0.62478667963
kurtosis  =  -1.32877032167
n_points  =  228
period  =  0.612944940114
period_SNR  =  34.4879270293
period_log10FAP  =  -35.9811369923
period_uncertainty  =  0.000100285496706
phase_cusum  =  0.308441952021
phase_eta  =  0.0566785938867
phi21  =  0.649062667884
phi31  =  2.15387012807
quartile31  =  0.5725
r21  =  0.417845841663
r31  =  0.224499788722
shapiro_w  =  0.893343806267
skewness  =  -0.367766380196
slope_per10  =  -0.169286393263
slope_per90  =  0.307819423208
stetson_k  =  0.852017365486
weighted_mean  =  14.2439919028
weighted_std  =  0.297457539472
