-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.74


######### Lightcurve features #########

amplitude  =  0.113661800604
cusum  =  0.168697860444
eta  =  1.78018573068
hl_amp_ratio  =  0.98716908125
kurtosis  =  0.0260944137499
n_points  =  303
period  =  0.679676568501
period_SNR  =  15.329757482
period_log10FAP  =  -3.38784089483
period_uncertainty  =  0.000206384764972
phase_cusum  =  0.194050904096
phase_eta  =  1.80462116761
phi21  =  -1.47429653787
phi31  =  -1.08306420842
quartile31  =  0.3
r21  =  0.43471587561
r31  =  0.24175687492
shapiro_w  =  0.994865596294
skewness  =  0.206176159342
slope_per10  =  -0.0430799989651
slope_per90  =  0.0520747134211
stetson_k  =  0.794952162882
weighted_mean  =  18.5468473355
weighted_std  =  0.213127003516
