-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.55


######### Lightcurve features #########

amplitude  =  0.331255016843
cusum  =  0.173189809746
eta  =  0.912749488309
hl_amp_ratio  =  0.652789147182
kurtosis  =  2.57653348166
n_points  =  119
period  =  0.163825252505
period_SNR  =  11.3402445626
period_log10FAP  =  -6.14315356583
period_uncertainty  =  5.83246712046e-06
phase_cusum  =  0.26647484011
phase_eta  =  1.13175481441
phi21  =  0.426891449593
phi31  =  0.301182535917
quartile31  =  0.425
r21  =  0.270785318717
r31  =  0.0785966826697
shapiro_w  =  0.918583869934
skewness  =  -0.312360594849
slope_per10  =  -0.0165589020382
slope_per90  =  0.0794571621023
stetson_k  =  0.772129116763
weighted_mean  =  12.8313909378
weighted_std  =  0.342703200491
