-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.44


######### Lightcurve features #########

amplitude  =  0.179031657213
cusum  =  0.121968822374
eta  =  1.77209122319
hl_amp_ratio  =  1.08112079966
kurtosis  =  0.235526676018
n_points  =  375
period  =  0.828835504443
period_SNR  =  32.8834737887
period_log10FAP  =  -16.0198173069
period_uncertainty  =  0.000191806800669
phase_cusum  =  0.164262195748
phase_eta  =  1.68503420492
phi21  =  1.31955307571
phi31  =  0.820621164452
quartile31  =  0.29
r21  =  0.389763454832
r31  =  0.0531970040942
shapiro_w  =  0.987562894821
skewness  =  0.298873977037
slope_per10  =  -0.0636257390178
slope_per90  =  0.0656116936893
stetson_k  =  0.795142078482
weighted_mean  =  18.9450961962
weighted_std  =  0.213066029692
