-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.78


######### Lightcurve features #########

amplitude  =  0.556821051806
cusum  =  0.383720469731
eta  =  0.76544495263
hl_amp_ratio  =  0.48322139178
kurtosis  =  -1.02603953902
n_points  =  29
period  =  0.658140856124
period_SNR  =  5.90115593115
period_log10FAP  =  -0.350628700887
period_uncertainty  =  0.000117371455487
phase_cusum  =  0.304842959281
phase_eta  =  0.708113853534
phi21  =  2.02649347223
phi31  =  4.12623465721
quartile31  =  0.45
r21  =  0.376639139669
r31  =  0.172042194917
shapiro_w  =  0.943128347397
skewness  =  -0.269486880354
slope_per10  =  -0.358345123316
slope_per90  =  0.416754202879
stetson_k  =  0.803640362723
weighted_mean  =  17.1553813689
weighted_std  =  0.267654636319
