-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.41


######### Lightcurve features #########

amplitude  =  1.39993330859
cusum  =  0.371150095737
eta  =  0.179622720792
hl_amp_ratio  =  0.301525321031
kurtosis  =  0.0432989394301
n_points  =  223
period  =  0.997295125254
period_SNR  =  32.7352207838
period_log10FAP  =  -28.2667337624
period_uncertainty  =  0.000281372080311
phase_cusum  =  0.218788006145
phase_eta  =  0.334238195758
phi21  =  -0.892684944688
phi31  =  -3.88803390547
quartile31  =  0.685
r21  =  0.680387180423
r31  =  0.236250164644
shapiro_w  =  0.855218172073
skewness  =  -1.07783378607
slope_per10  =  -0.0349895368372
slope_per90  =  0.13071561573
stetson_k  =  0.677410762295
weighted_mean  =  10.2633183857
weighted_std  =  0.478404225176
