-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.312502932335
cusum  =  0.114762715592
eta  =  0.597262290076
hl_amp_ratio  =  0.378187519017
kurtosis  =  -0.904246122746
n_points  =  297
period  =  0.561382935879
period_SNR  =  41.0796076835
period_log10FAP  =  -37.1191190018
period_uncertainty  =  0.00010755836438
phase_cusum  =  0.258246692016
phase_eta  =  0.0446929554425
phi21  =  0.885279594449
phi31  =  -1.06973346489
quartile31  =  0.46
r21  =  0.524074772004
r31  =  0.368111240799
shapiro_w  =  0.889366924763
skewness  =  -0.663646787345
slope_per10  =  -0.221106189683
slope_per90  =  0.223745564432
stetson_k  =  0.740460384715
weighted_mean  =  15.1244447839
weighted_std  =  0.312620227608
