-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.165727294475
cusum  =  0.110136681024
eta  =  1.00196914509
hl_amp_ratio  =  0.73948177008
kurtosis  =  -0.223914111736
n_points  =  387
period  =  0.609912736003
period_SNR  =  37.2020292222
period_log10FAP  =  -31.919352151
period_uncertainty  =  0.000103846753555
phase_cusum  =  0.267727108528
phase_eta  =  0.904510605898
phi21  =  -1.63234560917
phi31  =  -5.93825414061
quartile31  =  0.25
r21  =  0.299334719981
r31  =  0.037443821869
shapiro_w  =  0.989456176758
skewness  =  -0.18061988546
slope_per10  =  -0.0506121398501
slope_per90  =  0.0943075078489
stetson_k  =  0.805739391373
weighted_mean  =  18.0000536977
weighted_std  =  0.177519954579
