-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.57


######### Lightcurve features #########

amplitude  =  0.169327544784
cusum  =  0.115962215989
eta  =  1.88131792417
hl_amp_ratio  =  0.888291565428
kurtosis  =  0.161838378497
n_points  =  380
period  =  0.601594812899
period_SNR  =  25.8901665951
period_log10FAP  =  -13.6207308094
period_uncertainty  =  0.00010104723683
phase_cusum  =  0.162754077773
phase_eta  =  1.75087064658
phi21  =  0.642971557111
phi31  =  1.72415936571
quartile31  =  0.39
r21  =  0.5405784892
r31  =  0.335706635367
shapiro_w  =  0.995636165142
skewness  =  0.18482659337
slope_per10  =  -0.0388211816823
slope_per90  =  0.0348919699999
stetson_k  =  0.808821396185
weighted_mean  =  19.2876668642
weighted_std  =  0.265042351926
