-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.272004168146
cusum  =  0.0938178748969
eta  =  0.55821299154
hl_amp_ratio  =  0.665661251249
kurtosis  =  -0.94426384815
n_points  =  329
period  =  0.653533457844
period_SNR  =  42.8485878549
period_log10FAP  =  -44.7119266608
period_uncertainty  =  0.000139494874625
phase_cusum  =  0.276603693613
phase_eta  =  0.0671990275325
phi21  =  1.14543714253
phi31  =  2.49238191782
quartile31  =  0.34
r21  =  0.514819810473
r31  =  0.34489389085
shapiro_w  =  0.954795122147
skewness  =  -0.349481082172
slope_per10  =  -0.163362139501
slope_per90  =  0.467050003353
stetson_k  =  0.833394869007
weighted_mean  =  13.4434938224
weighted_std  =  0.224471091632
