<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.23463292633
cusum  =  0.119173357657
eta  =  0.728653298973
hl_amp_ratio  =  0.429170583701
kurtosis  =  -0.722263631899
n_points  =  362
period  =  0.565072739692
period_SNR  =  32.3077046899
period_log10FAP  =  -32.3784873132
period_uncertainty  =  8.85305434929e-05
phase_cusum  =  0.246780344382
phase_eta  =  0.800977406552
phi21  =  1.01031596924
phi31  =  1.24322247705
quartile31  =  0.39
r21  =  0.270971252844
r31  =  0.0458077205461
shapiro_w  =  0.940326809883
skewness  =  -0.573534469278
slope_per10  =  -0.0586351065589
slope_per90  =  0.0591043064592
stetson_k  =  0.732457775698
weighted_mean  =  17.5200984072
weighted_std  =  0.247620707201
</pre></body></html>