-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.78


######### Lightcurve features #########

amplitude  =  0.172381305077
cusum  =  0.152285211357
eta  =  0.865406055111
hl_amp_ratio  =  1.00718753726
kurtosis  =  -0.50633166503
n_points  =  346
period  =  0.382808234845
period_SNR  =  37.2406872655
period_log10FAP  =  -30.0034856928
period_uncertainty  =  4.06257417099e-05
phase_cusum  =  0.183708829492
phase_eta  =  1.01805623027
phi21  =  -1.86568093413
phi31  =  -2.73625805152
quartile31  =  0.2375
r21  =  0.0826965223141
r31  =  0.150532796742
shapiro_w  =  0.992113530636
skewness  =  -0.101133964461
slope_per10  =  -0.0544777819452
slope_per90  =  0.0550381662745
stetson_k  =  0.798979959735
weighted_mean  =  17.4245566376
weighted_std  =  0.165420320553
