-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.284682129912
cusum  =  0.152477664192
eta  =  0.993169994259
hl_amp_ratio  =  0.78141665656
kurtosis  =  -0.588994531472
n_points  =  390
period  =  0.625392654137
period_SNR  =  34.9470027421
period_log10FAP  =  -27.1565697497
period_uncertainty  =  0.000108424527078
phase_cusum  =  0.209142845814
phase_eta  =  0.771995294988
phi21  =  -2.59907240796
phi31  =  -1.14887098436
quartile31  =  0.4675
r21  =  0.539084196738
r31  =  0.345184838675
shapiro_w  =  0.989954590797
skewness  =  -0.0419395961886
slope_per10  =  -0.0635232369286
slope_per90  =  0.0430709265719
stetson_k  =  0.796464752977
weighted_mean  =  18.8319950982
weighted_std  =  0.307229017394
