-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.365684228944
cusum  =  0.163971970354
eta  =  0.446614066564
hl_amp_ratio  =  0.680457346398
kurtosis  =  -1.09902272636
n_points  =  372
period  =  0.566364771325
period_SNR  =  41.9107733852
period_log10FAP  =  -44.8161811767
period_uncertainty  =  0.000102788528127
phase_cusum  =  0.254780418649
phase_eta  =  0.311577683446
phi21  =  0.815907350553
phi31  =  1.97049171415
quartile31  =  0.59
r21  =  0.430670624936
r31  =  0.23715245693
shapiro_w  =  0.925456047058
skewness  =  -0.412292591795
slope_per10  =  -0.085533553348
slope_per90  =  0.172300015111
stetson_k  =  0.83678794852
weighted_mean  =  14.4699566686
weighted_std  =  0.350445523311
