-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.140109073839
cusum  =  0.112345601956
eta  =  0.64148039615
hl_amp_ratio  =  0.596138717848
kurtosis  =  -1.12121307164
n_points  =  426
period  =  0.608017854494
period_SNR  =  49.9548168617
period_log10FAP  =  -62.1412197366
period_uncertainty  =  0.000102484134149
phase_cusum  =  0.262101437492
phase_eta  =  0.275903745054
phi21  =  -1.84918322977
phi31  =  -3.3954523966
quartile31  =  0.22
r21  =  0.385184670337
r31  =  0.209087682525
shapiro_w  =  0.949368178844
skewness  =  -0.235187406734
slope_per10  =  -0.1421476538
slope_per90  =  0.1769048094
stetson_k  =  0.834304477857
weighted_mean  =  15.3054700069
weighted_std  =  0.124285919809
