-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.188626499445
cusum  =  0.130183262698
eta  =  0.72018650261
hl_amp_ratio  =  1.16244110283
kurtosis  =  -1.14009596377
n_points  =  307
period  =  0.750076255653
period_SNR  =  45.0027052434
period_log10FAP  =  -39.431252628
period_uncertainty  =  0.000159999208281
phase_cusum  =  0.269517038121
phase_eta  =  0.28068305479
phi21  =  -1.92826577865
phi31  =  -0.389532854266
quartile31  =  0.275
r21  =  0.423886140591
r31  =  0.282634329463
shapiro_w  =  0.962525010109
skewness  =  -0.040270403832
slope_per10  =  -0.256903171661
slope_per90  =  0.238385415196
stetson_k  =  0.864276706829
weighted_mean  =  15.3889834869
weighted_std  =  0.161399805263
